From 1f02ab5c692801709221d4e27f3001a40cb4e8ae Mon Sep 17 00:00:00 2001
From: Hassan Abouelela <47495861+HassanAbouelela@users.noreply.github.com>
Date: Sun, 17 Jan 2021 02:41:24 +0300
Subject: Updates Switch Statement Indent

Changes the switch statement indentation level to 1 in the eslint
config, and updates files accordingly.

Signed-off-by: Hassan Abouelela <47495861+HassanAbouelela@users.noreply.github.com>
---
 src/pages/FormPage.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/pages/FormPage.tsx')

diff --git a/src/pages/FormPage.tsx b/src/pages/FormPage.tsx
index 2d34b3c..c49b9fd 100644
--- a/src/pages/FormPage.tsx
+++ b/src/pages/FormPage.tsx
@@ -177,8 +177,8 @@ function FormPage(): JSX.Element {
 
             // TODO: Parse input from each question, and submit
             switch (question.type) {
-            default:
-                console.log(question.id, prop.props.public_state);
+                default:
+                    console.log(question.id, prop.props.public_state);
             }
         });
 
-- 
cgit v1.2.3

