From 443b811dce5c4a3944466f1a1e81854443255e00 Mon Sep 17 00:00:00 2001
From: Joe Banks <joseph@josephbanks.me>
Date: Mon, 12 Oct 2020 13:36:06 +0100
Subject: Remove pointless comment

---
 src/index.tsx | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'src/index.tsx')

diff --git a/src/index.tsx b/src/index.tsx
index 783d34f..22f18cd 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -45,7 +45,4 @@ ReactDOM.render(
   document.getElementById('root')
 );
 
-// If you want your app to work offline and load faster, you can change
-// unregister() to register() below. Note this comes with some pitfalls.
-// Learn more about service workers: https://bit.ly/CRA-PWA
 serviceWorker.unregister();
-- 
cgit v1.2.3

