From 9f04d5f5effd07534c9eb5b9f8886c8f970d0dc6 Mon Sep 17 00:00:00 2001
From: Hassan Abouelela <47495861+HassanAbouelela@users.noreply.github.com>
Date: Sun, 7 Mar 2021 00:46:47 +0300
Subject: Fixes Return Home Button Centering

Fixes the centering of the return home button on closed forms, by
removing the style wrapper.

Signed-off-by: Hassan Abouelela <47495861+HassanAbouelela@users.noreply.github.com>
---
 src/components/OAuth2Button.tsx | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/components/OAuth2Button.tsx')

diff --git a/src/components/OAuth2Button.tsx b/src/components/OAuth2Button.tsx
index 25c5871..885c080 100644
--- a/src/components/OAuth2Button.tsx
+++ b/src/components/OAuth2Button.tsx
@@ -31,16 +31,16 @@ const errorStyles =  css`
   visibility: hidden;
   width: 100%;
   left: 0;
-  
+
   text-align: center;
   white-space: normal;
   box-sizing: border-box;
-  
+
   padding: 0 15rem;
   @media (max-width: 750px) {
     padding: 0 5rem;
   }
-  
+
   color: red;
   margin-top: 2.5rem;
 `;
-- 
cgit v1.2.3

