From d8d4a2b296ae62d4f309903d4533263222619874 Mon Sep 17 00:00:00 2001
From: Joe Banks <joseph@josephbanks.me>
Date: Mon, 12 Oct 2020 14:05:10 +0100
Subject: Fix the SVG scaling with new SVG loader

---
 src/components/HeaderBar/index.tsx | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'src/components/HeaderBar/index.tsx')

diff --git a/src/components/HeaderBar/index.tsx b/src/components/HeaderBar/index.tsx
index a38e97b..8928a08 100644
--- a/src/components/HeaderBar/index.tsx
+++ b/src/components/HeaderBar/index.tsx
@@ -14,10 +14,6 @@ top: 0;
 position: absolute;
 width: 100%;
 transition: height 1s;
-
-@media (max-width: 770px) {
-  height: 140px;
-}
 `;
 
 function HeaderBar({ title }: HeaderBarProps) {
-- 
cgit v1.2.3

